m) μ Pseudoproper decay length (

2500

- 2000

- 1500

- 1000

- 500- 0 500 1000 1500 2000 2500

mμ Entries/40

1-10

1

10

210

= 34/40 dof /^2χ 2c < 3.16 GeV/

-e^+em

2.92 <

= 5.02 TeV NNs ALICE p-Pb,

c > 1.3 GeV/ Tp

data fit, all ψ fit, prompt J/ from B ψ fit, J/ fit, background